Colorant Alignment Test

The resolution is x pixels per inch. The number printed with each test is the number of pixels the line in the middle has been shifted with respect to the neighbouring lines.

Horizontal Alignment

Vertical Alignment

Author: Martin Lottermoser $Id: calign.ps,v 1.3 2000/08/30 16:53:36 Martin Rel $