Error in findfont: ------------------------------------------------------------------------ This is a script to test CJK fonts such as CID-keyed fonts. If you have not done CID-keyed fonts installation and definitions at /Resource/CMap and CIDFnmap or /Resource/CIDFont of ghostscript, then this script can’t work correctly. For details, please see README at http://www.gyve.org/gs-cjk/supplement.   If you throw this script into a printer, it requires PostScript 3 printer and CID-keyed fonts specified in this script. ------------------------------------------------------------------------
Error in findfont: Ryumin-Light.Roman
Error in findfont: GothicBBB-Medium.Katakana
Error in findfont: GothicBBB-Medium.Roman